#!/usr/bin/perl5
#
# dhcp-renew.hlp
#
# Copyright 1988-1996 Silicon Graphics, Inc.
# All rights reserved.
#
# This is UNPUBLISHED PROPRIETARY SOURCE CODE of Silicon Graphics, Inc.;
# the contents of this file may not be disclosed to third parties, copied or
# duplicated in any form, in whole or in part, without the prior written
# permission of Silicon Graphics, Inc.
#
# RESTRICTED RIGHTS LEGEND:
# Use, duplication or disclosure by the Government is subject to restrictions
# as set forth in subdivision (c)(1)(ii) of the Rights in Technical Data
# and Computer Software clause at DFARS 252.227-7013, and/or in similar or
# successor clauses in the FAR, DOD or NASA FAR Supplement. Unpublished -
# rights reserved under the Copyright Laws of the United States.
#
# $Id: dhcp-renew.hlp,v 1.3 1997/04/17 21:23:04 shotes Exp $

print <<EndOfFile;
Content-type: text/html

<FORM>
<H2>Renewing your Current DHCP Lease</H2>
<P>
When requesting a lease renewal, you will be prompted for the following 
parameters.  These can be left blank to use the default values.
</P>
<P>
<STRONG>Your host name:</STRONG> This field shows your current host name.
When your lease is renewed, you will retain the host name.  This field 
is not editable.  
</P>
(Default value: determined by system)
<P>
<STRONG>Your IP address:</STRONG> This field shows your IP address under 
your current DHCP lease.  This will continue to be your IP address after 
your lease is renewed.  You cannot edit this field either.
</P>
(Default value: determined by system)
<P>
<STRONG>DHCP Server address:</STRONG> This field shows the IP address 
of your current DHCP server.  This is the server from whom you are 
requesting a lease renewal.  This field is not editable. 
</P>
(Default value: determined by system)
<P>
<STRONG>New desired lease time:</STRONG>
This is the amount of time (in days) you would like before your new lease
expires.  The actual lease alotted to you may be for a shorter period
of time if the DHCP server is configured with a low maximum lease time.
If you do not enter a value here, the server will choose a default
lease time.
</P>
(Default value: 1095 days [3 years])
<P>
<CENTER>
<INPUT TYPE="button" VALUE="Back to Form" onClick="window.location='dhcp-renew.cgi'">
</CENTER>
</FORM>
EndOfFile
